ALTER TABLE `vt_Page` CHANGE `isSecure` `isSecure` ENUM('n','y') CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL DEFAULT 'y';

ALTER TABLE `vt_DraftPage` CHANGE `isSecure` `isSecure` ENUM('n','y') CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL DEFAULT 'y';

UPDATE `vt_DPageOption` SET `value` = 'y' WHERE `name` = 'isSecure';

update `vt_DraftPageOption`
set `value` = 'y'
where `name` = 'isSecure';

update `vt_PageOption`
set `value` = 'y'
where `name` = 'isSecure';

update `vt_DraftPage`
set `isSecure` = 'y'
where 1;

update `vt_Page`
set `isSecure` = 'y'
where 1;

