INSERT INTO `ma_Settings` (`name`, `idCategory`, `fieldType`, `label`, `value`, `options`, `description`, `required`, `system`, `sorter`, `added`, `changed`) VALUES
('achConfirmationPopupHeader', 6, 'header', 'Confirmation popup #1 for ACH Payment Information', '', '', '', 'n', 'n', 900, NOW(), NOW()),
('achConfirmationPopupHtml', 6, 'htmlEditor', '', '<p>ATTENTION:  It is very common for Financial Institutions/Banks to NOT allow an Electronic Check transaction to an unauthorized third-party. Please provide your Financial Institution/Bank with the following information before "clicking" the proceed button below to finish the payment process. <b>Red Rock Innovations Originator ID # 1813249292.</b> By following this process, it will help ensure that your payment is processed successfully. </p>\r\n', '', '', 'n', 'n', 910, NOW(), NOW()),
('achConfirmationPopup2Header', 6, 'header', 'Confirmation popup #2 for ACH Payment Information', '', '', '', 'n', 'n', 950, NOW(), NOW()),
('achConfirmationPopup2Html', 6, 'htmlEditor', '', '<p>If you have NOT already contacted your Financial Institution/Bank and your company does NOT allow electronic debits from unauthorized parties, please do not proceed and instead please first ensure that your bank whitelists the following: <b>Red Rock Innovations Originator ID # 1813249292.</b> Once whitelisted as a “trusted” party, please select "confirm" below. </p>\r\n', '', '', 'n', 'n', 960, NOW(), NOW());

