SET @OLD_UNIQUE_CHECKS=@@UNIQUE_CHECKS, UNIQUE_CHECKS=0;
SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0;
SET @OLD_SQL_MODE=@@SQL_MODE, SQL_MODE='STRICT_TRANS_TABLES,STRICT_ALL_TABLES,NO_ZERO_IN_DATE,ERROR_FOR_DIVISION_BY_ZERO,NO_AUTO_CREATE_USER,NO_ENGINE_SUBSTITUTION,ALLOW_INVALID_DATES';


-- -----------------------------------------------------
-- Table `_maintenanceLogT`
-- -----------------------------------------------------
DROP TABLE IF EXISTS `_maintenanceLogT` ;

CREATE TABLE IF NOT EXISTS `_maintenanceLogT` (
  `id` INT UNSIGNED NOT NULL AUTO_INCREMENT,
  `msg` VARCHAR(100) NOT NULL,
  `added` TIMESTAMP NOT NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP,
  PRIMARY KEY (`id`))
ENGINE = ARCHIVE;


SET SQL_MODE=@OLD_SQL_MODE;
SET FOREIGN_KEY_CHECKS=@OLD_FOREIGN_KEY_CHECKS;
SET UNIQUE_CHECKS=@OLD_UNIQUE_CHECKS;
