/*!40101 SET @saved_cs_client     = @@character_set_client */;
/*!40101 SET character_set_client = utf8 */;
CREATE TABLE `qs_SanityCheckFileRegistry` (
  `tableAlias` varchar(50) NOT NULL,
  `fieldName` varchar(50) NOT NULL,
  `pageQuery` varchar(255) DEFAULT NULL,
  PRIMARY KEY (`tableAlias`,`fieldName`)
) ENGINE=MyISAM DEFAULT CHARSET=utf8;
/*!40101 SET character_set_client = @saved_cs_client */;
INSERT INTO `qs_SanityCheckFileRegistry` (`tableAlias`, `fieldName`, `pageQuery`) VALUES ('Gallery','image','<type=Gallery\\Admin\\>'),('GalleryCategory','image','<type=Gallery\\Category\\Admin\\>'),('Manufacturer','image','<type=Manufacturer_Admin_>'),('News','image','<type=News_Admin_>'),('News','file','<type=News_Admin_>'),('Page','headerImage','<type=Cms_>'),('People','image','<type=People_Admin_>'),('Slide','image','<type=Slide_Admin_>'),('Slide','backgroundImage','<type=Slide_Admin_>'),('SocialLink','image','<type=SocialLink_Admin_>');
