/*!40101 SET @saved_cs_client     = @@character_set_client */;
/*!40101 SET character_set_client = utf8 */;
CREATE TABLE `qs_DPageHandler` (
  `name` varchar(64) NOT NULL DEFAULT '',
  `title` text NOT NULL,
  `sorter` int(11) NOT NULL DEFAULT '0',
  PRIMARY KEY (`name`)
) ENGINE=MyISAM DEFAULT CHARSET=utf8;
/*!40101 SET character_set_client = @saved_cs_client */;
INSERT INTO `qs_DPageHandler` (`name`, `title`, `sorter`) VALUES ('site','Site Page',0),('user','User Page',1),('userLogin','User Login Page',2),('admin','Admin Page',3);
