-- remove page contact/thanks.html

INSERT INTO `qs_Settings` (`name`, `idCategory`, `fieldType`, `label`, `value`, `options`, `description`, `required`, `system`, `sorter`, `added`, `changed`) VALUES
('contactFormEmailThanksMessage', 1, 'htmlEditor', 'Thank You Message for Contact Form', '<p style="text-align: center;"><strong>Thank you, your submission has been received. </strong></p>\r\n\r\n<p style="text-align: center;"><strong>We will respond to you shortly.</strong></p>\r\n', '', '', 'n', 'n', 832, NOW(), NOW());

INSERT INTO `qs_SettingsOptions` (`name`, `variable`, `value`, `type`, `sorter`) VALUES
('contactFormEmailThanksMessage', 'height', '200', 'int', NULL),
('contactFormEmailThanksMessage', 'mode', 'view', 'string', NULL);
